Floors
------
 
If you have floors turned on in your configuration (use [X]), this
will segregate the BBS into modular areas of rooms.  Each floor will
typically contain rooms related to that floor topic.  This all 
depends on how the sysop sets up the system, as not all BBSs will 
have floors enabled.  If your floor mode is on, you will have to use
more than just the [G]oto command to read all the new messages or move
from room to room.  If you want to goto the rooms on the other floors,
use [>] (move up) or [<] (move down) then you can use [G]oto again to 
read messages.  You can only move to another floor from the Lobby>.
 
If you have the floor mode turned off, all the rooms in the system
that you have access to will be on one pseudo-floor.  That is, you
won't have to use [<] or [>] to see all the rooms.  Using [G] or 
[.][G] will allow you to goto all the rooms as they are grouped on 
one floor for easy use.
